Center at RA 09 27 03.01392 DEC 39 02 20.8519

CONT: 4C39.25 IPOL 1663.771 MHZ 4C39.25.ICL001.3

PLot file version 1 created 10-JUN-2002 18:07:30

Cont peak flux = 1.9599E+00 JY/BEAM Levs = 1.960E+00 * (-0.058, 0.058, 0.116, 0.232, 0.463, 0.927)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250