Center at RA 19 24 39.45588 DEC 15 40 43.9413

CONT: J1924+15 IPOL 6667.950 MHZ J1924+1540.ICL001.5

PLot file version 1 created 03-MAR-2004 17:00:16

Cont peak flux = 6.5431E-01 JY/BEAM Levs = 6.543E-01 * (-0.011, 0.011, 0.023, 0.045, 0.091, 0.181, 0.362, 0.725)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100