Center at RA 19 55 42.73827 DEC 51 31 48.5462

CONT: J1955+51 IPOL 6667.950 MHZ J1955+5131.ICL001.5

PLot file version 1 created 03-MAR-2004 17:00:09

Cont peak flux = 7.1395E-01 JY/BEAM Levs = 7.140E-01 * (-0.029, 0.029, 0.057, 0.114, 0.229, 0.458, 0.915)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100