Center at RA 09 27 03.01392 DEC 39 02 20.8519

CONT: 4C39.25 IPOL 1652.803 MHZ 4C39.25.ICL001.3

PLot file version 1 created 15-SEP-2003 11:21:20

Cont peak flux = 2.9107E+00 JY/BEAM Levs = 2.911E+00 * (-0.005, 0.005, 0.011, 0.021, 0.042, 0.084, 0.169, 0.337, 0.674)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250