Gain amp vs UTC time for NGC4051.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 15-SEP-2003 11:14:20

1R JB 10 5 0 2R WB 4 2 0 3R EB 4 2 0 4R ON 2 1 0 5R MC 1.0 0.5 6R TR

Gain

4 2 0 7R SH 0.4 0.2 0.0 8R UR 0.5 0.4 0.3 0.2 0.1 9R CM 0.8 0.6 0.4 0.2 10R NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

0.14 0.12 0.10 0.08 0.06

Gain amp vs UTC time for NGC4051.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 15-SEP-2003 11:14:20

1R JB 20 10 0 2R WB 4 2 0 3R EB 3 2 1 4R ON 2 1 0 5R MC 0.8 0.6 0.4 0.2 0.0 6R TR

Gain

1.5 1.0 0.5 0.0 7R SH 0.4 0.3 0.2 0.1 8R UR 0.8 0.6 0.4 0.2 9R CM 0.8 0.6 0.4 0.2 10R NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

0.3 0.2 0.1

Gain amp vs UTC time for NGC4051.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 15-SEP-2003 11:14:20

1R JB 3 2 1 0 2R WB 3 2 1 0 3R EB 2.5 2.0 1.5 1.0 0.5 4R ON 2 1 0 5R MC 1.5 1.0 0.5 0.0 6R TR

Gain

1.0 0.5 0.0 7R SH 0.4 0.2 0.0 8R UR 0.6 0.4 0.2 10R NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

0.6 0.4 0.2 0.0

Gain amp vs UTC time for NGC4051.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 15-SEP-2003 11:14:21

1R JB 1.5 1.0 0.5 2R WB 2 1 0 3R EB 2.5 2.0 1.5 1.0 0.5 4R ON 1.5 1.0 0.5 0.0 5R MC 1.5 1.0 0.5 0.0 6R TR

Gain

2 1 0 7R SH 0.6 0.4 0.2 0.0 8R UR 1.0 0.5 0.0 10R NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

0.8 0.6 0.4 0.2 0.0

Gain amp vs UTC time for NGC4051.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 15-SEP-2003 11:14:21

1L JB 3 2 1 0 2L WB 6 4 2 0 3L EB 2.5 2.0 1.5 1.0 0.5 4L ON 10 5 0 5L MC 0.6 0.4 0.2 0.0 6L TR

Gain

4 2 0 7L SH 0.6 0.4 0.2 8L UR 2 1 0 9L CM 2 1 0 10L NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

0.6 0.4 0.2

Gain amp vs UTC time for NGC4051.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 15-SEP-2003 11:14:21

1L JB 4 2 0 2L WB 2 1 0 3L EB 3 2 1 4L ON 4 2 0 5L MC 1.0 0.5 0.0 6L TR

Gain

0.6 0.4 0.2 7L SH 0.9 0.8 0.7 0.6 9L CM

TIME (HOURS)

14 16 18 20 22 1/00 1/02

0.4 0.3 0.2

Gain amp vs UTC time for NGC4051.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 15-SEP-2003 11:14:21

1L JB 3 2 1 0 2L WB 10 5 0 3L EB 1.5 1.0 0.5 4L ON 6 4 2 0 5L MC 0.8 0.6 0.4 0.2 0.0 6L TR

Gain

1.21.0 0.80.6 0.40.2

7L SH 2 1 0 10L NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

0.15 0.10 0.05

Gain amp vs UTC time for NGC4051.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 15-SEP-2003 11:14:22

1L JB 2.0 1.5 1.0 0.5 2L WB 4 2 0 3L EB 2.0 1.5 1.0 0.5 4L ON 2 1 0 5L MC 1.5 1.0 0.5 0.0 6L TR

Gain

2 1 0 7L SH 0.6 0.4 0.2 8L UR

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1.5 1.0 0.5 0.0

Gain amp vs UTC time for J1221+4411.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 15-SEP-2003 11:19:04

1R JB

1.05 1.00 0.95 0.90 0.85

2R WB 1.1 1.0 0.9 3R EB 1.4 1.2 1.0 4R ON 1.6 1.4 1.2 1.0 0.8 0.6 5R MC 2.5 2.0 1.5 1.0 6R TR

Gain

4 3 2 1 7R SH 2.5 2.0 1.5 1.0 0.5 8R UR 1.2 1.0 0.8 0.6 9R CM 2.0 1.5 1.0 10R NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

2.0 1.5 1.0 0.5

Gain amp vs UTC time for J1221+4411.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 15-SEP-2003 11:19:04

1R JB 2.5 2.0 1.5 1.0 2R WB

1.15 1.10 1.05 1.00 0.95

3R EB 1.4 1.2 1.0 4R ON 1.5 1.0 0.5 5R MC

1.81.6 1.41.2 1.00.8

6R TR

Gain

2.5 2.0 1.5 1.0 7R SH 1.6 1.4 1.2 1.0 0.8 8R UR 1.6 1.4 1.2 1.0 0.8 9R CM 1.6 1.4 1.2 1.0 0.8 10R NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

3 2 1

Gain amp vs UTC time for J1221+4411.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 15-SEP-2003 11:19:04

1R JB 4 3 2 1 2R WB

1.00 0.95

0.90

3R EB 1.3 1.2 1.1 1.0 0.9 4R ON 2.0 1.5 1.0 0.5 5R MC 1.8 1.6 1.4 1.2 1.0 6R TR

Gain

2.5 2.0 1.5 1.0 7R SH 1.8 1.61.4 1.21.0 0.8 8R UR 1.8 1.6 1.41.2 1.0 0.8 10R NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

10 5 0

Gain amp vs UTC time for J1221+4411.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 15-SEP-2003 11:19:05

1R JB 6 4 2 2R WB 1.2 1.1 1.0 3R EB 1.4 1.2 1.0 4R ON 1.6 1.4 1.2 1.0 0.8 5R MC 1.6 1.4 1.2 1.0 0.8 0.6 6R TR

Gain

2.0 1.5 1.0 7R SH 2.0 1.5 1.0 8R UR 1.4 1.2 1.0 0.8 10R NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

2.5 2.0 1.5 1.0

Gain amp vs UTC time for J1221+4411.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 15-SEP-2003 11:19:05

1L JB 2.0 1.5 1.0 2L WB

1.00 0.95 0.90 3L EB 1.4 1.2 1.0 4L ON 1.5 1.0 0.5 5L MC 1.6 1.4 1.2 1.0 6L TR

Gain

2.0 1.5 1.0 7L SH 2.0 1.5 1.0 10L NT

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1.6 1.4 1.2 1.0 0.8 0.6

Gain amp vs UTC time for J1221+4411.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 15-SEP-2003 11:19:05

1L JB 8 6 4 2 0 2L WB

1.05 1.00 0.95

3L EB 1.4 1.2 1.0 4L ON

1.81.6 1.41.2 1.00.8

5L MC 1.6 1.4 1.2 1.0 0.8 6L TR

Gain

2.5 2.0 1.5 1.0 7L SH 1.5 1.0 0.5 8L UR

TIME (HOURS)

14 16 18 20 22 1/00 1/02

1.4 1.2 1.0 0.8

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 15-SEP-2003 11:21:05

1R JB 990 980 970 2R WB 995 990 985 980 975 3R EB

1040

1030

1020 4R ON 950 900 850 5R MC

1200 1100 1000 900 6R TR

MilliGain

1120 1100 1080 1060 1040 1020

7R SH

1200

1180

1160

8R UR 840 820 800 9R CM 958 956 954 952 950 10R NT

TIME (HOURS)

15 30 31 32 33 34 35 36 37 38 39

640 620 600 580

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 15-SEP-2003 11:21:05

1R JB

1080 1075 1070 1065

2R WB

1040 1030 1020

3R EB

1025 1020 1015 1010

4R ON 905 900 895 890 885 5R MC

1600 1400 1200 1000 800 6R TR

MilliGain

1240 1220 1200 1180 7R SH

1140 1120 1100 1080

8R UR 950 940 930 920 9R CM

TIME (HOURS)

15 30 31 32 33 34 35 36 37 38 39

965 960 955

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 15-SEP-2003 11:21:05

1R JB

1.05 1.04 1.03

2R WB

0.985 0.980 0.975 0.970 0.965 3R EB

0.970 0.965 0.960 0.955

4R ON

1.13

1.12

1.11

5R MC 1.6 1.4 1.2 1.0 0.8 6R TR

Gain

1.16 1.15 1.14

7R SH

1.10 1.05 1.00 0.95

8R UR

1.10 1.08 1.06

10R NT

TIME (HOURS)

15 30 31 32 33 34 35 36 37 38 39

0.64 0.62 0.60 0.58

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 15-SEP-2003 11:21:05

1R JB 870 865 860 855 2R WB

1020

1010

1000

3R EB 965 960 955 950 4R ON 935 930 925 920 915 5R MC 1200 1000 800 6R TR

MilliGain

985 980 975 970 965 7R SH

1360 1340 1320 1300 1280

8R UR

TIME (HOURS)

15 30 31 32 33 34 35 36 37 38 39

1140 1120 1100

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 15-SEP-2003 11:21:06

1L JB

1020 1010 1000 990 2L WB 990 980 970 3L EB

1040 1030 1020

4L ON

1060 1040 1020

5L MC

1400 1200 1000 800 6L TR

MilliGain

900 850 800 7L SH

1195 1190 1185 1180 1175

8L UR

1070 1060 1050 1040 1030

9L CM

1055

1050

1045

10L NT

TIME (HOURS)

15 30 31 32 33 34 35 36 37 38 39

780 760 740 720

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 15-SEP-2003 11:21:06

1L JB

1.285 1.280 1.275 1.270 1.265

2L WB

1.06 1.05 1.04

3L EB

1.050 1.045 1.040

4L ON

1.005 1.000 0.995 0.990 0.985

5L MC 1.6 1.4 1.2 1.0 0.8 6L TR

Gain

0.905 0.900 0.895 0.890 0.885

7L SH

1.40 1.38 1.36 1.34

9L CM

TIME (HOURS)

15 30 31 32 33 34 35 36 37 38 39

0.92 0.91 0.90 0.89

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 15-SEP-2003 11:21:06

1L JB

1.06 1.05 1.04

2L WB

0.985 0.980 0.975 0.970 0.965

3L EB

0.965 0.960 0.955 0.950

4L ON

1.06

1.05

1.04

5L MC 1.2 1.0 0.8 6L TR

Gain

0.95 0.94 0.93

7L SH

1.44 1.42 1.40 1.38

10L NT

TIME (HOURS)

15 30 31 32 33 34 35 36 37 38 39

0.62 0.60 0.58 0.56

Gain amp vs UTC time for 4C39.25.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 15-SEP-2003 11:21:06

1L JB 838 836 834 832 830 828 2L WB

1020

1010

1000

3L EB

1010 1005 1000 995 4L ON

1040 1030 1020

5L MC

1100 1000 900 800 6L TR

MilliGain

1020 1010 1000 990 7L SH

1100 1080 1060

8L UR

TIME (HOURS)

15 30 31 32 33 34 35 36 37 38 39

860 850 840 830

Gain amp vs UTC time for J0958+4725.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 15-SEP-2003 14:17:55

1R JB 990 985 980 2R WB 980 960 940 3R EB

1040 1035 1030 1025

4R ON 1050 1000 950 5R MC

1200 1150 1100 1050

6R TR

MilliGain

1120 1110 1100 1090

7R SH

1000 980 960 8R UR 810 800 790 780 9R CM

1000 990 980 970 10R NT

TIME (HOURS)

16 17 18 19 20

1040 1020 1000

Gain amp vs UTC time for J0958+4725.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 15-SEP-2003 14:17:56

1R JB

1.08 1.07 1.06

2R WB

1.04 1.02 1.00 0.98

3R EB

1.025 1.020 1.015 1.010 1.005

4R ON

1.00 0.95 0.90 0.85

5R MC

1.10 1.05 1.00 0.95

6R TR

Gain

1.2 1.1 1.0 7R SH

0.96 0.95 0.94 0.93

8R UR

0.94 0.92 0.90

9R CM

1.005 1.000 0.995 0.990

10R NT

TIME (HOURS)

16 17 18 19 20

1.8 1.6 1.4 1.2 1.0

Gain amp vs UTC time for J0958+4725.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 15-SEP-2003 14:17:56

1R JB

1050 1045 1040 1035

2R WB

1000 980 960 940 3R EB 970 960 950 940 4R ON

1200 1100 1000 900 5R MC

1100 1050 1000 950 6R TR

MilliGain

1140 1120 1100

7R SH 880 860 840 820 8R UR

1100 1080 1060 1040

10R NT

TIME (HOURS)

16 17 18 19 20

1090 1080 1070 1060 1050

Gain amp vs UTC time for J0958+4725.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 15-SEP-2003 14:17:56

1L JB

1280 1270 1260 2L WB

1060 1050 1040 1030

3L EB

1060 1050 1040 1030 4L ON

1100 1050 1000 950 5L MC 1000 950 900 6L TR

MilliGain

920 900 880 7L SH 1250 1200 1150 9L CM

TIME (HOURS)

16 17 18 19 20

940 930 920 910

Gain amp vs UTC time for J0958+4725.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 15-SEP-2003 14:17:57

1L JB

1055 1050 1045

2L WB

1000 980 960 3L EB 970 960 950 4L ON

1200 1150 1100 1050

5L MC

1050 1000 950 6L TR

MilliGain

960 940 920 7L SH

1280 1260 1240 1220

10L NT

TIME (HOURS)

16 17 18 19 20

1010 1000 990 980

Gain amp vs UTC time for J0958+4725.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 15-SEP-2003 14:17:57

1L JB 832 830 828 826 824 2L WB

1040 1030 1020 1010 3L EB

1010 1000 990 980 970 4L ON

1150 1100 1050

5L MC

1050 1000 950 6L TR

MilliGain

1020 1000 980 960 7L SH

1000 950 900 8L UR

TIME (HOURS)

16 17 18 19 20

820 810 800 790

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 15-SEP-2003 14:19:16

1R JB 985 980 975 2R WB 995 990 985 980 975 3R EB

1020 1010 1000

4R ON

1020 1000 980 960 940 5R MC

1200 1150 1100

6R TR

MilliGain

1100 1050 1000

7R SH

1100

1050

1000

8R UR 900 850 800 750 9R CM 970 965 960 10R NT

TIME (HOURS)

20 08 09 10 11 12 13 14 15 16 17

1020 1000 980 960 940

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 15-SEP-2003 14:19:16

1R JB

1068 1066 1064 1062 1060

2R WB

1030 1020 1010 3R EB

1025 1020 1015 1010 1005

4R ON 920 900 880 5R MC

1050 1000 950 900 6R TR

MilliGain

980960 940920 900880

7R SH

1050 1000 950 900 8R UR

1060 1040 1020 1000 980 960 9R CM 980 970 960 10R NT

TIME (HOURS)

20 08 09 10 11 12 13 14 15 16 17

1600 1400 1200 1000 800

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 15-SEP-2003 14:19:16

1R JB

1045 1040 1035 1030 1025

2R WB 980 975 970 3R EB 975 970 965 960 4R ON 940 920 900 5R MC

1050 1000 950 900 6R TR

MilliGain

1200 1150 1100

7R SH

1150 1100 1050 1000 950 8R UR

1200 1150 1100 1050

10R NT

TIME (HOURS)

20 08 09 10 11 12 13 14 15 16 17

1000 900 800

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 15-SEP-2003 14:19:16

1R JB 880 870 860 2R WB

1010 1005 1000 995 3R EB 976 974 972 970 968 966 4R ON

1000 950 900 5R MC 900 850 800 6R TR

MilliGain

1160 1140 1120 1100 1080

7R SH

1300

1250

1200

8R UR

1150 1100 1050 1000

10R NT

TIME (HOURS)

20 08 09 10 11 12 13 14 15 16 17

1100 1000 900 800 700

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 15-SEP-2003 14:19:17

1L JB

1000 995 990 985 2L WB 990 980 970 3L EB

1030 1020 1010 1000

4L ON

1100 1080 1060 1040

5L MC

1050 1000 950 6L TR

MilliGain

900 850 800 7L SH

1080 1060 1040 1020 1000980

8L UR

1100 1050 1000 950 9L CM 1060 1055

10L NT

TIME (HOURS)

20 08 09 10 11 12 13 14 15 16 17

1250 1200 1150

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 15-SEP-2003 14:19:17

1L JB

1270 1265 1260

2L WB

1050 1040 1030

3L EB 1050 1040 1030

4L ON

1060 1040 1020 1000

5L MC

1000 950 900 6L TR

MilliGain

900 850 7L SH

1200 1150 1100 1050

9L CM

TIME (HOURS)

20 08 09 10 11 12 13 14 15 16 17

920 910 900

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 15-SEP-2003 14:19:17

1L JB

1066 1064 1062 1060 1058

2L WB 978 976974 972970 968 3L EB 970 965 960 955 4L ON

1140 1120 1100 1080 1060 1040

5L MC 950 900 850 6L TR

MilliGain

1000 950 900 7L SH

1300 1200 1100

10L NT

TIME (HOURS)

20 08 09 10 11 12 13 14 15 16 17

900 800 700

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 15-SEP-2003 14:19:17

1L JB 850 840 830 2L WB

1010 1005 1000 995 3L EB

1020

1015

1010

4L ON

1120 1100 1080 1060 1040 1020

5L MC 950 900 850 800 6L TR

MilliGain

1080 1060 1040 1020 1000

7L SH 960 940 920 900 8L UR

TIME (HOURS)

20 08 09 10 11 12 13 14 15 16 17

850 800 750

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 15-SEP-2003 14:20:17

1R JB

1020 1000 980 960 2R WB 990 980 970 3R EB

1025 1020 1015

4R ON 970 960 950 5R MC 1140 1130 1120

6R TR

MilliGain

1070 1060 1050 1040 1030

8R UR 870 860 850 9R CM 990 980 970 960 950 10R NT

TIME (HOURS)

21 51 52 53 54 55 56 57 58 59 22 00

880 860 840

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 15-SEP-2003 14:20:17

1R JB

1050 1040 1030 1020 1010

2R WB

1040

1030

1020

3R EB

1020

1015

1010

1005

4R ON 900 890 880 5R MC 1020

1010

1000

6R TR

MilliGain

1080 1060 1040 1020 1000

8R UR 990 980 970 960 950 9R CM

1020 1000 980 960 940 10R NT

TIME (HOURS)

21 51 52 53 54 55 56 57 58 59 22 00

1300 1200 1100 1000 900

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 15-SEP-2003 14:20:18

1L JB 1020 1000 980 2L WB 985 980 975 970 965 3L EB

1036 1034 1032 1030 1028

4L ON

1050 1045 1040 1035

5L MC 995 990 985 6L TR

MilliGain

960 940 920 900 8L UR

1110 1100 1090 1080

9L CM

1100 1080 1060

10L NT

TIME (HOURS)

21 51 52 53 54 55 56 57 58 59 22 00

1080 1060 1040 1020 1000

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 15-SEP-2003 14:20:18

1L JB

1250 1240 1230 1220 1210 2L WB

1050 1045 1040

3L EB

1050

1040

1030 4L ON

1010 1000 990 5L MC 990 985 980 975 6L TR

MilliGain

940 920 900 9L CM

TIME (HOURS)

21 51 52 53 54 55 56 57 58 59 22 00

960 940 920 900

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 15-SEP-2003 14:20:19

1L JB

1080 1060 1040 1020 2L WB 976 974 972 970 968 3L EB 970 965 960 4L ON

1070

1060

1050 5L MC 985 980 975 970 965 6L TR

MilliGain

920 900 880 860 10L NT

TIME (HOURS)

21 51 52 53 54 55 56 57 58 59 22 00

840 830 820 810

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 15-SEP-2003 14:20:19

1L JB 860 840 820 2L WB

1018 1016 1014 1012 1010 1008

3L EB

1010

1005 1000 4L ON

1045 1040 1035 1030 5L MC 970 960 950 6L TR

MilliGain

1000 980 960 940 8L UR

TIME (HOURS)

21 51 52 53 54 55 56 57 58 59 22 00

860 850 840

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 15-SEP-2003 14:28:39

1R JB

0.930 0.925 0.920 0.915

2R WB

1.02 1.00 0.98

3R EB

1.02 1.01 1.00 0.99

4R ON 1.3 1.2 1.1 1.0 0.9 5R MC

1.15 1.10 1.05

6R TR

Gain

1.35 1.30 1.25

8R UR

1.995 1.990 1.985 1.980

9R CM

0.97 0.96 0.95

10R NT

TIME (HOURS)

22 04 05 06 07 08 09 10 11 12 13

1.2 1.0 0.8 0.6

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 15-SEP-2003 14:28:39

1R JB

1.065 1.060 1.055 1.050 1.045

2R WB

1.04

1.02

1.00

3R EB 1.010

1.005

4R ON 1.2 1.0 0.8 5R MC

1.05 1.00 0.95 0.90

6R TR

Gain

1.2 1.1 1.0 8R UR

1.645 1.640 1.635 1.630

9R CM

0.97 0.96 0.95 0.94

10R NT

TIME (HOURS)

22 04 05 06 07 08 09 10 11 12 13

1.6 1.4 1.2 1.0

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 15-SEP-2003 14:28:40

1R JB

1090 1080 1070

2R WB 990 980 970 3R EB 975 970 965 960 955 4R ON

1300 1200 1100 1000

5R MC

1050 1000 950 900 850 6R TR

MilliGain

1200

1100

1000

10R NT

TIME (HOURS)

22 04 05 06 07 08 09 10 11 12 13

1200 1000 800

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 15-SEP-2003 14:28:40

1R JB 920 910 900 2R WB

1005 1000 995 990 985 3R EB 972 970 968 966 964 962 4R ON

1100 1000 900 800 5R MC 900 850 800 750 6R TR

MilliGain

1100

1000 900 10R NT

TIME (HOURS)

22 04 05 06 07 08 09 10 11 12 13

1400

1200

1000

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 15-SEP-2003 14:28:40

1L JB

0.955 0.950 0.945 0.940 0.935

2L WB

1.00 0.98 0.96

3L EB

1.03 1.02 1.01 1.00

4L ON 1.4 1.2 1.0 5L MC

1.05 1.00 0.95

6L TR

Gain

1.20 1.15 1.10 1.05

8L UR

2.510 2.505 2.500 2.495

9L CM 1.04 1.03 1.02

10L NT

TIME (HOURS)

22 04 05 06 07 08 09 10 11 12 13

1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 15-SEP-2003 14:28:40

1L JB

1250 1240 1230

2L WB

1050 1040 1030 1020 1010

3L EB

1050 1045 1040 1035

4L ON

1200 1000 800 5L MC

1050 1000 950 900 850 6L TR

MilliGain

1050 1000 950 900 9L CM

TIME (HOURS)

22 04 05 06 07 08 09 10 11 12 13

900 890 880

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 15-SEP-2003 14:28:40

1L JB

1070 1060 1050 1040

2L WB 990 980 970 960 3L EB 980 970 960 4L ON

1300 1200 1100 1000 900 5L MC

1000 950 900 850 6L TR

MilliGain

950 900 850 800 10L NT

TIME (HOURS)

22 04 05 06 07 08 09 10 11 12 13

1200 1000 800

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 15-SEP-2003 14:28:41

1L JB 890 880 870 860 2L WB

1010 1000 990 3L EB

1030 1020 1010

4L ON

1300 1200 1100 1000 900 5L MC 950 900 850 800 750 6L TR

MilliGain

TIME (HOURS)

22 04 05 06 07 08 09 10 11 12 13

1000 900 800