Center at RA 09 58 19.67165 DEC 47 25 07.8425

CONT: J0958+47 IPOL 1652.803 MHZ J0958+4725.ICL001.3

PLot file version 1 created 15-SEP-2003 14:18:43

Cont peak flux = 1.0858E+00 JY/BEAM Levs = 1.086E+00 * (-0.006, 0.006, 0.012, 0.024, 0.048, 0.095, 0.190, 0.380, 0.761)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250