Center at RA 12 21 27.04464 DEC 44 11 29.6717

CONT: J1221+44 IPOL 1652.803 MHZ J1221+4411.IIM001.1

PLot file version 1 created 15-SEP-2003 11:17:59

Cont peak flux = 3.7414E-01 JY/BEAM Levs = 3.741E-01 * (-0.261, 0.261, 0.522)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250