Center at RA 12 03 09.61500 DEC 44 31 52.7500

CONT: NGC4051 IPOL 1652.803 MHZ NGC4051.ICL001.3

PLot file version 1 created 15-SEP-2003 11:16:38

Cont peak flux = 4.5095E-04 JY/BEAM Levs = 4.510E-04 * (-0.232, 0.232, 0.464, 0.928)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250