Gain amp vs UTC time for J1642.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 25-FEB-2004 14:55:34

1R JB

0.89 0.88 0.87

1L JB 1.030 1.025 1.020

2R CM

0.84 0.83 0.82 0.81

2L CM

1.30

1.28

1.26

3R EF

1.085 1.080 1.075 1.070 3L EF

Gain

0.92 0.91 0.90 0.89

4R ON 0.98 0.97 0.96

4L ON

1.16 1.14 1.12 1.10 1.08

6R TR

2.34 2.32 2.30 2.28 2.26

6L TR

TIME (HOURS)

23 41 30 42 00 30 43 00 30 44 00 30 45 00

0.690 0.685 0.680 0.675

Gain amp vs UTC time for J1642.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 25-FEB-2004 14:55:34

7R HH

0.94 0.93 0.92 0.91 7L HH

Gain

TIME (HOURS)

23 41 30 42 00 30 43 00 30 44 00 30 45 00

1.12 1.11 1.10