Center at RA 16 42 58.80995 DEC 39 48 36.9939

CONT: J1642 IPOL 6663.350 MHZ J1642.ICL001.5

PLot file version 1 created 25-FEB-2004 14:58:11

Cont peak flux = 3.9815E+00 JY/BEAM Levs = 3.981E+00 * (-0.029, 0.029, 0.058, 0.117, 0.233, 0.466, 0.932)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100