Center at RA 17 51 32.81857 DEC 09 39 00.7285

CONT: J1751 IPOL 6663.340 MHZ J1751.ICL001.5

PLot file version 1 created 25-FEB-2004 18:10:12

Cont peak flux = 1.8197E+00 JY/BEAM Levs = 1.820E+00 * (-0.050, 0.050, 0.099, 0.199, 0.397, 0.795)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100