Center at RA 20 02 10.41830 DEC 47 25 28.7770

CONT: 2002+472 IPOL 22227.550 MHZ 2002+472.IIM001.1

PLot file version 1 created 14-FEB-2006 12:56:04

Cont peak flux = 3.4365E-01 JY/BEAM Levs = 3.436E-03 * (-88.6, 88.63)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

50

0

-50

-100