Center at RA 20 07 44.94500 DEC 40 29 48.6040

CONT: 2007+402 IPOL 22227.550 MHZ 2007+402.ICL001.3

PLot file version 1 created 14-FEB-2006 12:57:35

Cont peak flux = 8.9187E-01 JY/BEAM Levs = 8.919E-03 * (-1.50, 1.501, 3.002, 6.003, 12.01, 24.01, 48.03, 96.05)

MilliARC SEC

MilliARC SEC

80 60 40 20 0 -20 -40 -60 -80

80

60

40

20

0

-20

-40

-60

-80