Center at RA 20 05 30.99800 DEC 77 52 43.2470

CONT: 2007+777 IPOL 22227.550 MHZ 2007+777.ICL001.1

PLot file version 1 created 14-FEB-2006 12:56:03

Cont peak flux = 7.2270E-01 JY/BEAM Levs = 7.227E-03 * (-7.43, 7.434, 14.87, 29.74, 59.48)

MilliARC SEC

MilliARC SEC

30 20 10 0 -10 -20 -30

30

20

10

0

-10

-20

-30