Center at RA 20 05 30.99800 DEC 77 52 43.2470

CONT: 2007+777 IPOL 22227.550 MHZ 2007+777.ICL001.2

PLot file version 1 created 14-FEB-2006 12:56:52

Cont peak flux = 7.9882E-01 JY/BEAM Levs = 7.988E-03 * (-1.07, 1.074, 2.147, 4.295, 8.590, 17.18, 34.36, 68.72)

MilliARC SEC

MilliARC SEC

30 20 10 0 -10 -20 -30

30

20

10

0

-10

-20

-30