Center at RA 20 15 28.72979 DEC 37 10 59.5148

CONT: 2015+371 IPOL 22227.550 MHZ 2015+3710.ICL001.2

PLot file version 1 created 14-FEB-2006 12:57:11

Cont peak flux = 1.4184E+00 JY/BEAM Levs = 1.418E-02 * (-1.27, 1.266, 2.532, 5.064, 10.13, 20.26, 40.52, 81.03)

MilliARC SEC

MilliARC SEC

30 20 10 0 -10 -20 -30

30

20

10

0

-10

-20

-30