Center at RA 18 25 37.60955 DEC -07 37 30.0128

CONT: J1825-07 IPOL 6668.937 MHZ J1825-0737.ICL001.7

PLot file version 1 created 25-JAN-2005 13:31:38

Cont peak flux = 2.4748E-01 JY/BEAM Levs = 2.475E-01 * (-0.008, 0.008, 0.015, 0.030, 0.061, 0.122, 0.243, 0.487, 0.973)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100