Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 25-JAN-2005 17:27:49

1R CM 0.75 0.70 0.65

1L CM

0.64 0.62 0.60 0.58 0.56

2R DA

0.70 0.65 0.60 0.55 2L DA

0.67 0.66 0.65 0.64 0.63 4R MC 1.6 1.4 1.2 1.0 0.8 0.6 4L MC

Gain

1.80 1.75 1.70 1.65 5R ON 0.9 0.8 0.7 0.6 0.5 6R TR 2.0 1.8 1.6 6L TR 1.3 1.2 1.1 7R NT

TIME (HOURS)

09 46 47 48 49 50 51 52 53 54 55

1.6 1.4 1.2

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 25-JAN-2005 17:27:49

7L NT 1.4 1.3 1.2 1.1 8R HH

1.620 1.615 1.610 1.605

9R WB 0.35

0.30

9L WB

Gain

TIME (HOURS)

09 46 47 48 49 50 51 52 53 54 55

1.450 1.445 1.440 1.435