Gain amp vs UTC time for J1812-0648.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 25-JAN-2005 17:26:35

1R CM

1.320 1.315 1.310 1.305

2L DA 4.5 4.0 3.5 3R EF 1.4 1.2 1.0 0.8 0.6 0.4 3L EF 1.2 1.0 0.8 0.6 0.4 0.2 4L MC

0.685 0.680 0.675 0.670 5R ON

Gain

1.935 1.930 1.925 1.920 5L ON

12.495 12.490 12.485 12.480

6R TR

0.840 0.835 0.830 0.825 6L TR

2.885 2.880 2.875 2.870 7R NT

TIME (HOURS)

11 12 13 14 15 16 17

2.205 2.200 2.195 2.190

Gain amp vs UTC time for J1812-0648.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 25-JAN-2005 17:26:35

7L NT 3.5 3.0 2.5 9R WB

2.675 2.670 2.665 2.660

9L WB

Gain

TIME (HOURS)

11 12 13 14 15 16 17

0.685 0.680 0.675 0.670