Gain amp vs UTC time for J1825-0737.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 25-JAN-2005 17:27:31

1R CM 7 6 5 4 1L CM 4 3 2 2R DA

10.975 10.970 10.965 10.960 2L DA 15.0 14.5 14.0

3R EF 3 2 1 0 3L EF

Gain

3 2 1 0 4R MC 6 5 4 4L MC 5 4 3 5R ON

20.470 20.465 20.460 20.455

5L ON

TIME (HOURS)

10 11 12 13 14 15 16 17 18 19

44.2 44.0 43.8 43.6

Gain amp vs UTC time for J1825-0737.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 25-JAN-2005 17:27:31

6R TR 4.0 3.5 3.0 2.5 6L TR

3.675 3.670 3.665 3.660 7R NT 12.560 12.555 12.550 12.545 7L NT 3.360 3.355 3.350 3.345 9R WB

26.855 26.850 26.845 26.840

9L WB

Gain

TIME (HOURS)

10 11 12 13 14 15 16 17 18 19

51.2 51.0 50.8 50.6 50.4 50.2