Gain amp vs UTC time for J1812-0648.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 1 created 26-JAN-2005 15:10:18

1R CM

0.195 0.190 0.185 0.180

1L CM 3.5 3.0 2.5 2.0 2R DA

2.885 2.880 2.875 2.870

2L DA 2.0 1.5 1.0 0.5 3R EF 3 2 1 0 3L EF

Gain

4 3 2 1 4R MC

0.080 0.075 0.070 0.065 4L MC 15.340 15.335 15.330 15.325 5R ON

2.245 2.240 2.235 2.230

5L ON

TIME (HOURS)

10 11 12 13 14 15 16 17

148.270 148.265 148.260 148.255

Gain amp vs UTC time for J1812-0648.MULTI.1 SN 2 Rpol & Lpol IF 1

Plot file version 2 created 26-JAN-2005 15:10:18

6R TR 4.0 3.8 3.6 7L NT 15.915 15.910 15.905 15.900 9R WB

219.320 219.315 219.310 219.305

9L WB

Gain

TIME (HOURS)

10 11 12 13 14 15 16 17

260.505 260.500 260.495 260.490