Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 1 created 01-OCT-2021 12:50:47

1 JB IF 1R 20 10 0 1 JB IF 1L 20 10 0 1 JB IF 2R 20 10 0 1 JB IF 2L 20 10 0 1 JB IF 3R 20 10 0 1 JB IF 3L

Degrees

20 10 0 1 JB IF 4R 20 10 0 1 JB IF 4L 15 10 5 0 -5 2 WB IF 1R 10 0 -10 2 WB IF 1L

Time (hours)

18 30 19 00 30 20 00

10 0 -10

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 2 created 01-OCT-2021 12:50:47

2 WB IF 2R 5 0 -5 2 WB IF 2L 10 0 -10 2 WB IF 3R 10 0 -10 2 WB IF 3L 10 0 -10 2 WB IF 4R 10 0 -10 2 WB IF 4L

Degrees

10 0 -10 3 EF IF 1R

0.001

0.000

-0.001 3 EF IF 1L

0.001

0.000

-0.001 3 EF IF 2R

0.001

0.000

-0.001 3 EF IF 2L

Time (hours)

18 30 19 00 30 20 00

0.001

0.000

-0.001

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 3 created 01-OCT-2021 12:50:47

3 EF IF 3R 1 0 -1 3 EF IF 3L 1 0 -1 3 EF IF 4R 1 0 -1 3 EF IF 4L 1 0 -1 4 MC IF 1R

10000 0 -10000 4 MC IF 1L

MilliDegrees

10000 0 -10000 4 MC IF 2R

10000 0 -10000 4 MC IF 2L

10000 0 -10000 4 MC IF 3R

10000 0 -10000 4 MC IF 3L

Time (hours)

18 30 19 00 30 20 00

10000 0 -10000

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 4 created 01-OCT-2021 12:50:47

4 MC IF 4R 10 0 -10 4 MC IF 4L 10 0 -10 5 NT IF 1R 10 0 -10 5 NT IF 1L 15 10 5 0 -5 5 NT IF 2R 10 0 -10 5 NT IF 2L

Degrees

10 0 -10 5 NT IF 3R 10 0 -10 5 NT IF 3L 10 0 -10 5 NT IF 4R 10 0 -10 5 NT IF 4L

Time (hours)

18 30 19 00 30 20 00

10 0 -10

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 5 created 01-OCT-2021 12:50:47

6 O8 IF 1R 10 0 -10 6 O8 IF 1L 10 0 -10 6 O8 IF 2R 6 4 2 0 -2 -4 6 O8 IF 2L 10 0 -10 6 O8 IF 3R 5 0 -5 6 O8 IF 3L

Degrees

10 0 -10 6 O8 IF 4R 10 0 -10 6 O8 IF 4L 5 0 -5 7 T6 IF 1R 15 10 5 0 -5 7 T6 IF 1L

Time (hours)

18 30 19 00 30 20 00

15 10 5 0 -5

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 6 created 01-OCT-2021 12:50:47

7 T6 IF 2R 15 10 5 0 -5 7 T6 IF 2L 10 5 0 -5 7 T6 IF 3R 10 5 0 -5 7 T6 IF 3L 10 5 0 -5 7 T6 IF 4R 10 5 0 -5 7 T6 IF 4L

Degrees

10 5 0 -5 8 UR IF 1R 15 10 5 0 -5 8 UR IF 1L 10 0 -10 8 UR IF 2R 10 0 -10 8 UR IF 2L

Time (hours)

18 30 19 00 30 20 00

10 0 -10

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 7 created 01-OCT-2021 12:50:47

8 UR IF 3R 10 0 -10 8 UR IF 3L 10 0 -10 8 UR IF 4R 10 0 -10 8 UR IF 4L 10 0 -10 9 TR IF 1R 10 0 -10 9 TR IF 1L

Degrees

15 10 5 0 -5 9 TR IF 2R 10 0 -10 9 TR IF 2L 10 0 -10 9 TR IF 3R 10 5 0 -5 9 TR IF 3L

Time (hours)

18 30 19 00 30 20 00

10 0 -10

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 8 created 01-OCT-2021 12:50:47

9 TR IF 4R 10 5 0 -5 9 TR IF 4L 10 0 -10 11 SV IF 1R 5 0 -5 -10 11 SV IF 1L 5 0 -5 -10 11 SV IF 2R 15 10 5 0 -5 11 SV IF 2L

Degrees

10 5 0 -5 11 SV IF 3R 5 0 -5 -10 11 SV IF 3L 0 -5 -10 11 SV IF 4R 10 5 0 -5 11 SV IF 4L

Time (hours)

18 30 19 00 30 20 00

10 5 0 -5

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 9 created 01-OCT-2021 12:50:47

12 ZC IF 1R 0 -2 -4 -6 12 ZC IF 1L 360 358 356 354 12 ZC IF 2R 6 4 2 0 12 ZC IF 2L 6 4 2 0 12 ZC IF 3R -2 -4 -6 -8 12 ZC IF 3L

Degrees

358 356 354 12 ZC IF 4R 4 2 0 -2 12 ZC IF 4L 4 2 0 13 BD IF 1R 5 0 -5 -10 13 BD IF 1L

Time (hours)

18 30 19 00 30 20 00

5 0 -5 -10

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 10 created 01-OCT-2021 12:50:47

13 BD IF 2R 10 5 0 -5 13 BD IF 2L 10 5 0 -5 13 BD IF 3R 0 -5 -10 13 BD IF 3L 5 0 -5 -10 -15 13 BD IF 4R 10 5 0 -5 13 BD IF 4L

Degrees

10 5 0 -5 14 IR IF 1R 100 50 0 14 IR IF 1L 60 40 20 0 14 IR IF 2R 60 40 20 0 14 IR IF 2L

Time (hours)

18 30 19 00 30 20 00

80 60 40 20 0

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 11 created 01-OCT-2021 12:50:47

14 IR IF 3R 0 -50 -100 -150

14 IR IF 3L 60 40 20 0 14 IR IF 4R 100 50 0 14 IR IF 4L 10 0 -10 15 SR IF 1R 5 0 -5 15 SR IF 1L

Degrees

5 0 -5 15 SR IF 2R 5 0 -5 15 SR IF 2L 5 0 -5 15 SR IF 3R 5 0 -5 -10 15 SR IF 3L

Time (hours)

18 30 19 00 30 20 00

5 0 -5

Gain phs vs UTC time for J1345+4452.MULTI.1 SN 1 Rpol & Lpol IF 1 - 4

Plot file version 12 created 01-OCT-2021 12:50:47

15 SR IF 4R 0 -5 15 SR IF 4L 4 2 0 -2 -4 -6 16 CM IF 2R 5 0 -5 -10 16 CM IF 2L 5 0 -5 -10 -15 16 CM IF 3R 0 -5 -10 16 CM IF 3L

Degrees

0 -5 -10 17 DA IF 2R 5 0 -5 -10 17 DA IF 2L 10 0 -10 17 DA IF 3R 10 0 -10 -20 17 DA IF 3L

Time (hours)

18 30 19 00 30 20 00

10 0 -10 -20 -30