Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 01-JUL-2003 20:13:51

1R JB 3.5 3.0 2.5 2.0 1.5 2R EB 1.2 1.1 1.0 3R NT 1.2 1.0 0.8 0.6 0.4 4R ON 5 4 3 2 1 5R TR

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

1.0 0.8 0.6

Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Lpol IF 1

Plot file version 2 created 01-JUL-2003 20:13:52

1L JB 2.0 1.5 1.0 2L EB 1.4 1.2 1.0 0.8 3L NT 1.4 1.2 1.0 4L ON 2.0 1.5 1.0 0.5 5L TR 0.8 0.6 0.4 6L HH

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

1.81.6 1.41.2 1.00.8

Gain amp vs UTC time for J2025+3343.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 01-JUL-2003 20:14:16

1R JB 2.2 2.0 1.8 1.6 2R EB 2.0 1.5 1.0 3R NT 1.2 1.0 0.8 4R ON 3 2 1 5R TR

Gain

TIME (HOURS)

12 14 16 18 20 22

1.0 0.8 0.6 0.4

Gain amp vs UTC time for J2025+3343.MULTI.1 SN 2 Lpol IF 1

Plot file version 2 created 01-JUL-2003 20:14:16

1L JB 3 2 1 2L EB 1.2 1.0 0.8 0.6 3L NT 1.8 1.6 1.4 1.2 1.0 4L ON 2.0 1.5 1.0 0.5 5L TR

Gain

TIME (HOURS)

12 14 16 18 20 22

0.8 0.6 0.4

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 01-JUL-2003 20:14:42

1R JB

1200 1180 1160 1140 1120

2R EB

1095 1090 1085 1080 1075

3R NT

1050 1000 950 900 4R ON

1240 1220

1200 1180

5R TR

MilliGain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

1160

1140

1120

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Lpol IF 1

Plot file version 2 created 01-JUL-2003 20:14:42

1L JB 900 890 880 870 2L EB 940 920 900 3L NT

1200

1100

1000

4L ON 940 920 900 880 5L TR 860 850 840 6L HH

MilliGain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

1100 1000 900 800 700

Gain amp vs UTC time for J2136+0041.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 01-JUL-2003 20:35:52

1R JB

1400 1200 1000

2R EB

1140 1120 1100 1080

3R NT

840820 800780 760740

4R ON 740 720 700 680 660 5R TR

MilliGain

TIME (HOURS)

23 28 29 30 31 32 33 34

1200 1150 1100

Gain amp vs UTC time for J2136+0041.MULTI.1 SN 2 Lpol IF 1

Plot file version 2 created 01-JUL-2003 20:35:52

1L JB 900 800 700 2L EB 920 900 880 3L NT 970 960 950 940 4L ON

1080 1060 1040 1020

5L TR 690 680 670 660 650 6L HH

MilliGain

TIME (HOURS)

23 28 29 30 31 32 33 34

1040 1020 1000 980 960