Tsys vs UTC time for ep037a_1.MSORT.1 TY 1 Rpol IF 1

Plot file version 1 created 01-JUL-2003 18:33:41

1R JB

0.09 0.08 0.07

2R EB 0.9 0.8 0.7 0.6 0.5 3R NT 0.14 0.12 0.10 4R ON

0.035

0.030

5R TR

Kilo Kelvin

TIME (HOURS)

12 14 16 18 20 22 1/00 1/02 1/04 1/06

0.070 0.065 0.060

Tsys vs UTC time for ep037a_1.MSORT.1 TY 1 Lpol IF 1

Plot file version 2 created 01-JUL-2003 18:33:41

1L JB 95 90 85 80 2L EB 800 600 400 200 0 3L NT 130 120 110 100 90 4L ON 35 30 5L TR 200 150 100 50 6L HH

Kelvin

TIME (HOURS)

12 14 16 18 20 22 1/00 1/02 1/04 1/06

250 200 150 100 50