Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 02-JUL-2003 10:12:19

1R JB 3.0 2.5 2.0 1.5 2R EB 1.6 1.4 1.2 1.0 0.8 3R NT 1.0 0.8 0.6 0.4 4R ON 1.5 1.0 0.5 5R TR

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

1.0 0.8 0.6 0.4

Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 02-JUL-2003 10:12:19

1R JB 5 4 3 2 2R EB 1.4 1.2 1.0 3R NT 0.9 0.8 0.7 0.6 4R ON 1.2 1.0 0.8 0.6 0.4 0.2 5R TR

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

1.0 0.8 0.6

Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 02-JUL-2003 10:12:19

1R JB 2.5 2.0 1.5 2R EB 2.0 1.5 1.0 3R NT 1.2 1.0 0.8 0.6 0.4 4R ON 1.5 1.0 0.5 5R TR

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

2.5 2.0 1.5

Gain amp vs UTC time for J0555+3948.MULTI.1

SN 2 Rpol IF 4

Plot file version 4 created 02-JUL-2003 10:12:19

1R JB 3.5 3.0 2.5 2.0 1.5 2R EB 1.0 0.9 0.8 0.7 3R NT 1.4 1.2 1.0 0.8 0.6 0.4 4R ON

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

1.6 1.4 1.2 1.0 0.8

Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 02-JUL-2003 10:12:20

1L JB 2.0 1.5 1.0 2L EB 1.2 1.0 0.8 3L NT 1.2 1.0 0.8 0.6 4L ON 1.2 1.0 0.8 0.6 0.4 5L TR 0.8 0.6 0.4 6L HH

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

1.2 1.0 0.8 0.6

Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 02-JUL-2003 10:12:20

1L JB 2.0 1.5 1.0 0.5 2L EB 1.2 1.0 0.8 3L NT 1.2 1.0 0.8 0.6 4L ON 1.2 1.0 0.8 0.6 0.4 5L TR 0.7 0.6 0.5 0.4 6L HH

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

20 10 0

Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 02-JUL-2003 10:12:20

1L JB 2.0 1.5 1.0 0.5 2L EB 1.0 0.8 0.6 3L NT 1.0 0.8 0.6 0.4 4L ON

1.21.0 0.80.6 0.40.2

5L TR 0.6 0.5 0.4 0.3 6L HH

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

1.81.6 1.41.2 1.00.8

Gain amp vs UTC time for J0555+3948.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 02-JUL-2003 10:12:20

1L JB 3 2 1 2L EB 1.2 1.0 0.8 3L NT 1.2 1.0 0.8 0.6 4L ON 1.0 0.8 0.6 0.4 5L TR 0.8 0.6 0.4 6L HH

Gain

TIME (HOURS)

1/00 1/01 1/02 1/03 1/04 1/05

1.4 1.2 1.0 0.8 0.6

Gain amp vs UTC time for J2025+3343.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 02-JUL-2003 10:13:09

1R JB 2.0 1.5 1.0 2R EB 2.0 1.5 1.0 4R ON 0.8 0.6 0.4 5R TR

Gain

TIME (HOURS)

12 14 16 18 20 22

1.0 0.8 0.6

Gain amp vs UTC time for J2025+3343.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 02-JUL-2003 10:13:10

1R JB 6 4 2 2R EB 1.6 1.4 1.2 1.0 0.8 4R ON 4 2 0 5R TR

Gain

TIME (HOURS)

12 14 16 18 20 22

1.0 0.8 0.6

Gain amp vs UTC time for J2025+3343.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 02-JUL-2003 10:13:10

1R JB 2.5 2.0 1.5 1.0 2R EB 2.0 1.5 1.0 3R NT 1.1 1.0 0.9 0.8 4R ON 1.2 1.0 0.8 0.6 0.4 5R TR

Gain

TIME (HOURS)

12 14 16 18 20 22

4 3 2 1

Gain amp vs UTC time for J2025+3343.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 02-JUL-2003 10:13:10

1R JB 10 5 0 2R EB 2.0 1.5 1.0 4R ON 1.5 1.0 0.5 5R TR

Gain

TIME (HOURS)

12 14 16 18 20 22

1.5 1.0

Gain amp vs UTC time for J2025+3343.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 02-JUL-2003 10:13:11

1L JB 5 4 3 2 1 2L EB 1.0 0.8 0.6 3L NT 1.5 1.0 0.5 4L ON 2 1 0 5L TR

Gain

TIME (HOURS)

12 14 16 18 20 22 1.0 0.5

Gain amp vs UTC time for J2025+3343.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 02-JUL-2003 10:13:11

1L JB 3 2 1 2L EB 2.0 1.5 1.0 0.5 3L NT 3 2 1 4L ON 2.5 2.0 1.5 1.0 0.5 5L TR

Gain

TIME (HOURS)

12 14 16 18 20 22

6 4 2 0

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 02-JUL-2003 10:14:00

1R JB

1200 1150 1100 1050 2R EB

1155 1150 1145 1140 3R NT 850 800 750 700 4R ON 750 700 650 5R TR

MilliGain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

1100 1050 1000

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 02-JUL-2003 10:14:00

1R JB 2.5 2.4 2.3 2.2 2R EB

1.010 1.005 1.000 0.995 3R NT

0.90 0.85 0.80 0.75

4R ON

0.70 0.69 0.68 0.67 5R TR

Gain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

1.15 1.10 1.05

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 02-JUL-2003 10:14:00

1R JB

0.88 0.86 0.84 0.82 0.80

2R EB

1.14 1.12 1.10 1.08 1.06

3R NT

0.68

0.67

0.66

4R ON 1.2 1.1 1.0 0.9 5R TR

Gain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

3.4 3.3 3.2 3.1

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Rpol IF 4

Plot file version 4 created 02-JUL-2003 10:14:01

1R JB 950 900 850 800 750 2R EB

1200 1100 1000

3R NT 850 800 750 700 4R ON 750 700 650 5R TR

MilliGain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

1400 1300 1200 1100

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Lpol IF 1

Plot file version 5 created 02-JUL-2003 10:14:01

1L JB 840 820 800 780 760 740 2L EB

1040 1020 1000 980 960 3L NT 950 900 850 800 750 4L ON 800 700 600 5L TR 900 850 800 6L HH

MilliGain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

800 700 600

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 02-JUL-2003 10:14:01

1L JB 820 800 780 760 740 2L EB

1100 1050 1000

3L NT

1000 900 800 4L ON 800 700 600 5L TR 950 900 850 800 750 6L HH

MilliGain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

850 800 750 700

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 02-JUL-2003 10:14:01

1L JB

860840 820800 780760

2L EB

920900 880860 840820

3L NT 900 800 700 4L ON 800 700 600 5L TR 620 600 580 560 6L HH

MilliGain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

950 900 850 800

Gain amp vs UTC time for J1642+3948.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 02-JUL-2003 10:14:01

1L JB 850 800 750 2L EB 950 900 850 800 3L NT

1100 1000 900 4L ON 800 700 600 5L TR 700 600 500 6L HH

MilliGain

TIME (HOURS)

12 01 02 03 04 05 06 07 08

900 850 800

Gain amp vs UTC time for J2136+0041.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 02-JUL-2003 10:18:25

1R JB 1.4 1.3 1.2 2R EB 1.3 1.2 1.1 1.0 0.9 3R NT 0.9 0.8 0.7 4R ON 0.9 0.8 0.7 5R TR

Gain

TIME (HOURS)

23 28 29 30 31 32 33 34

1.6 1.5 1.4 1.3

Gain amp vs UTC time for J2136+0041.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 02-JUL-2003 10:18:26

1R JB 3.0 2.5 2.0 2R EB 1.3 1.2 1.1 1.0 0.9 3R NT 0.85 0.80 0.75

4R ON 0.9 0.8 0.7 5R TR

Gain

TIME (HOURS)

23 28 29 30 31 32 33 34

1.25 1.20 1.15

Gain amp vs UTC time for J2136+0041.MULTI.1 SN 2 Rpol IF 3

Plot file version 3 created 02-JUL-2003 10:18:26

1R JB 1.2 1.1 1.0 2R EB 1.2 1.1 1.0 0.9 3R NT

0.92 0.90 0.88 0.86 0.84

4R ON 1.0 0.9 0.8 0.7 5R TR

Gain

TIME (HOURS)

23 28 29 30 31 32 33 34

4.0 3.8 3.6

Gain amp vs UTC time for J2136+0041.MULTI.1 SN 2 Lpol IF 2

Plot file version 6 created 02-JUL-2003 10:18:27

1L JB 900 850 800 750 2L EB

1100 1000 900 3L NT 900 800 700 4L ON 1200 1000 800 5L TR 620 615 610 605 6L HH

MilliGain

TIME (HOURS)

23 28 29 30 31 32 33 34

1300 1200 1100 1000

Gain amp vs UTC time for J2136+0041.MULTI.1 SN 2 Lpol IF 3

Plot file version 7 created 02-JUL-2003 10:18:27

1L JB 0.9 0.8 0.7 2L EB

0.94 0.92 0.90 0.88 0.86 0.84 3L NT 0.8 0.7 0.6 4L ON 1.2 1.0 0.8 5L TR

0.40 0.39 0.38 0.37

6L HH

Gain

TIME (HOURS)

23 28 29 30 31 32 33 34

1.30 1.25 1.20

Gain amp vs UTC time for J2136+0041.MULTI.1 SN 2 Lpol IF 4

Plot file version 8 created 02-JUL-2003 10:18:27

1L JB

1100 1000 900 800 700 2L EB

1000 950 900 850 3L NT

1000 980 960 940 4L ON

1200 1100 1000

5L TR

MilliGain

TIME (HOURS)

23 28 29 30 31 32 33 34

1330 1325 1320