Center at RA 05 55 30.80561 DEC 39 48 49.1650

CONT: J0555+39 IPOL 6671.248 MHZ J0555+3948.IIM001.2

PLot file version 1 created 02-JUL-2003 10:11:57

Cont peak flux = 1.3311E+00 JY/BEAM Levs = 1.331E+00 * (-0.304, 0.304, 0.607)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100