Center at RA 20 25 10.84209 DEC 33 43 00.2143

CONT: J2025+33 IPOL 6671.248 MHZ J2025+3343.IIM001.2

PLot file version 1 created 02-JUL-2003 10:12:45

Cont peak flux = 3.4971E-01 JY/BEAM Levs = 3.497E-01 * (-0.372, 0.372, 0.745)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100