Center at RA 21 36 38.58632 DEC 00 41 54.2135

CONT: J2136+00 IPOL 6671.248 MHZ J2136+0041.ICL001.3

PLot file version 1 created 02-JUL-2003 10:19:13

Cont peak flux = 6.9328E-01 JY/BEAM Levs = 6.933E-01 * (-0.306, 0.306, 0.612)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100