Center at RA 01 39 41.97920 DEC 17 53 07.5491

CONT: J0139+17 IPOL 1652.803 MHZ J0139+1753.ICL001.3

PLot file version 1 created 01-NOV-2002 19:46:17

Cont peak flux = 4.8503E-01 JY/BEAM Levs = 4.850E-01 * (-0.010, 0.010, 0.020, 0.040, 0.080, 0.161, 0.322, 0.643)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250