Center at RA 19 22 34.69919 DEC 15 30 10.0321

CONT: J1922+15 IPOL 6668.339 MHZ J1922+1530.IIM001.1

PLot file version 1 created 24-MAR-2003 15:55:02

Cont peak flux = 1.7700E-01 JY/BEAM Levs = 1.770E-01 * (-0.309, 0.309, 0.617)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100