Center at RA 17 40 36.97785 DEC 52 11 43.4075

CONT: 1739+522 IPOL 1646.986 MHZ 1739+522.ICL001.3

PLot file version 1 created 04-MAR-2003 16:56:17

Cont peak flux = 4.4188E-01 JY/BEAM Levs = 4.419E-01 * (-0.020, 0.020, 0.040, 0.080, 0.160, 0.321, 0.641)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250