Center at RA 15 09 47.55390 DEC 05 45 31.7640

CONT: J1509+05 IPOL 1646.986 MHZ J1509+0545.ICL001.3

PLot file version 1 created 04-MAR-2003 16:57:12

Cont peak flux = 3.7199E-02 JY/BEAM Levs = 3.720E-02 * (-0.012, 0.012, 0.024, 0.047, 0.094, 0.188, 0.377, 0.753)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250