Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 20-MAR-2003 13:00:49

2R WB

1045 1040 1035 1030 1025

4R EB

1030 1020 1010

5R JB 980 970 960 950 7R TR

MilliGain

TIME (HOURS)

22 31 32 33 34 35 36 37

1000 980 960 940

Gain amp vs UTC time for 3C286.MULTI.1

SN 2 Rpol IF 2

Plot file version 2 created 20-MAR-2003 13:00:50

2R WB

1025 1020 1015 1010 1005

4R EB

1060

1050

1040

5R JB 940 930 920 7R TR

MilliGain

TIME (HOURS)

22 31 32 33 34 35 36 37

1120 1100 1080 1060 1040 1020

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 20-MAR-2003 13:00:50

2L WB 980 975 970 965 4L EB

1015 1010 1005 1000 995 5L JB 980 960 940 7L TR

MilliGain

TIME (HOURS)

22 31 32 33 34 35 36 37

940 920 900

Gain amp vs UTC time for 3C286.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 20-MAR-2003 13:00:50

2L WB 985 980 975 970 965 4L EB 950 940 930 5L JB

1140 1130 1120

7L TR

MilliGain

TIME (HOURS)

22 31 32 33 34 35 36 37

1040 1020 1000 980 960

Gain amp vs UTC time for 1739+522.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 20-MAR-2003 13:01:33

2R WB

1040

1020

1000

3R MC

1100 1000 900 800 700 4R EB 980 960 940 5R JB 998 996 994 992 990 988 7R TR

MilliGain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

1060 1040 1020 1000 980

Gain amp vs UTC time for 1739+522.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 20-MAR-2003 13:01:33

2R WB

1060

1040

1020

3R MC

1000 900 800 700 4R EB

1020 1000 980 960 5R JB 950 940 930 7R TR

MilliGain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

1100 1080 1060 1040 1020

Gain amp vs UTC time for 1739+522.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 20-MAR-2003 13:01:33

2L WB

1020 1000 980 3L MC

1000 900 800 700 4L EB

1100 1080 1060 1040 1020

5L JB 970 960 950 7L TR

MilliGain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

1050 1000 950

Gain amp vs UTC time for 1739+522.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 20-MAR-2003 13:01:33

2L WB

1010 1000 990 3L MC

1000 900 800 700 4L EB

1010 1000 990 980 5L JB

1152 1150 1148 1146 1144

7L TR

MilliGain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

1040 1020 1000 980

Gain amp vs UTC time for J1509+0545.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 20-MAR-2003 13:02:19

2R WB 1.1 1.0 0.9 0.8 3R MC 1.4 1.2 1.0 0.8 4R EB 1.1 1.0 0.9 5R JB 1.1 1.0 0.9 0.8 7R TR

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

1.5 1.0 0.5

Gain amp vs UTC time for J1509+0545.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 20-MAR-2003 13:02:19

2R WB 1.1 1.0 0.9 0.8 3R MC 1.8 1.6 1.4 1.2 1.0 0.8 4R EB 1.2 1.0 0.8 5R JB 1.1 1.0 0.9 0.8 7R TR

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

2.0 1.5 1.0 0.5

Gain amp vs UTC time for J1509+0545.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 20-MAR-2003 13:02:19

2L WB 1.2 1.0 0.8 0.6 3L MC 1.4 1.2 1.0 0.8 4L EB

1.15 1.10 1.05 1.00 0.95

5L JB 1.1 1.0 0.9 0.8 7L TR

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

1.5 1.0

Gain amp vs UTC time for J1509+0545.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 20-MAR-2003 13:02:20

2L WB 1.2 1.0 0.8 0.6 3L MC 1.4 1.2 1.0 0.8 4L EB 1.1 1.0 0.9 0.8 5L JB 1.3 1.2 1.1 1.0 0.9 7L TR

Gain

TIME (HOURS)

1/00 1/02 1/04 1/06 1/08 1/10

1.6 1.4 1.2 1.0 0.8 0.6

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 20-MAR-2003 13:15:26

2L WB

1.02 1.00 0.98

3L MC 1.1 1.0 0.9 4L EB

1.05 1.00 0.95 0.90 5L JB 8 6 4 2 7L TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10

2.5 2.0 1.5 1.0

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 20-MAR-2003 13:15:26

2L WB

1.02

1.00

0.98

3L MC

1.00 0.95 0.90 0.85

4L EB

1.02 1.00 0.98 0.96 0.94 0.92

5L JB 8 6 4 2 7L TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10

1.1 1.0 0.9

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Rpol IF 1

Plot file version 1 created 20-MAR-2003 13:20:34

2R WB

1.10 1.08 1.06 1.04 1.02

3R MC 2.0 1.5 1.0 4R EB

1.02 1.00 0.98 0.96 0.94 5R JB

1.00 0.95 0.90

7R TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10

1.3 1.2 1.1 1.0

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Rpol IF 2

Plot file version 2 created 20-MAR-2003 13:20:35

2R WB

1.08 1.06 1.04 1.02 1.00 3R MC 2.0 1.5 1.0 4R EB

1.06 1.04 1.02 1.00 0.98

5R JB

0.95 0.90 0.85 0.80 7R TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10

1.4 1.3 1.2 1.1

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 1

Plot file version 3 created 20-MAR-2003 13:20:35

2L WB

1.06 1.04 1.02 1.00 0.98 3L MC 2.0 1.5 1.0 4L EB

1.10

1.05

1.00 5L JB

1.00 0.95 0.90

7L TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10

1.2 1.1 1.0

Gain amp vs UTC time for OQ208.MULTI.1 SN 2 Lpol IF 2

Plot file version 4 created 20-MAR-2003 13:20:35

2L WB

1.06 1.04 1.02 1.00 0.98

3L MC 2.0 1.5 1.0 4L EB

1.04 1.02 1.00 0.98 0.96 0.94

5L JB

1.15 1.10 1.05 1.00

7L TR

Gain

TIME (HOURS)

22 1/00 1/02 1/04 1/06 1/08 1/10

1.3 1.2 1.1 1.0