Center at RA 18 49 16.07230 DEC 67 05 41.6799

CONT: 1849+670 IPOL 22244.303 MHZ 1849+670.IIM001.2

PLot file version 1 created 21-MAY-2004 15:58:33

Cont peak flux = 2.6218E-01 JY/BEAM Levs = 2.622E-01 * (-0.344, 0.344, 0.689)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40