Center at RA 01 02 45.76238 DEC 58 24 11.1366

CONT: J0102+58 IPOL 22244.303 MHZ J0102+58.ICL001.5

PLot file version 1 created 21-MAY-2004 16:00:53

Cont peak flux = 7.2215E-01 JY/BEAM Levs = 7.221E-01 * (-0.022, 0.022, 0.044, 0.089, 0.178, 0.355, 0.711)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40