Center at RA 01 36 58.59481 DEC 47 51 29.1001

CONT: J0136+47 IPOL 22244.303 MHZ J0136+47.IIM001.1

PLot file version 1 created 21-MAY-2004 15:58:31

Cont peak flux = 8.9691E-01 JY/BEAM Levs = 8.969E-01 * (-0.338, 0.338, 0.675)

MilliARC SEC

MilliARC SEC

40 30 20 10 0 -10 -20 -30 -40

40

30

20

10

0

-10

-20

-30

-40