Center at RA 01 12 12.94445 DEC 35 22 19.3367

CONT: J0112+35 IPOL 852.368 MHZ J0112+3522.ICL001.5

PLot file version 1 created 19-OCT-2004 11:03:44

Cont peak flux = 4.9098E-02 JY/BEAM Levs = 4.910E-02 * (-0.131, 0.131, 0.262, 0.525)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250