Center at RA 09 27 03.01392 DEC 39 02 20.8519

CONT: 4C39.25 IPOL 864.418 MHZ 4C39.25.IIM001.1

PLot file version 1 created 19-OCT-2004 13:57:10

Cont peak flux = 4.0723E-01 JY/BEAM Levs = 4.072E-01 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250