Center at RA 13 35 21.96224 DEC 45 42 38.2313

CONT: J1335+45 IPOL 864.418 MHZ J1335+4542.IIM001.2

PLot file version 1 created 19-OCT-2004 13:57:12

Cont peak flux = 2.8077E-02 JY/BEAM Levs = 2.808E-02 * (-0.382, 0.382, 0.764)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250