Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 1 created 19-OCT-2004 16:37:19

1 TR IF 1R

0.88 0.86 0.84

1 TR IF 1L

7.475 7.470 7.465 7.460 1 TR IF 2R

6.325 6.320 6.315 6.310

1 TR IF 2L

50.825 50.820 50.815 50.810 2 EF IF 1R 0.8 0.6 0.4 2 EF IF 1L

Gain

2.5 2.0 1.5 1.0 2 EF IF 2R 1.4 1.2 1.0 0.8 2 EF IF 2L 1.6 1.4 1.2 1.0 0.8 3 WB IF 1R 1.0 0.8 0.6 3 WB IF 1L

TIME (HOURS)

19 20 21 22 23

1.2 1.1 1.0 0.9

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 2 created 19-OCT-2004 16:37:19

3 WB IF 2R 1.3 1.2 1.1 1.0 0.9 3 WB IF 2L 1.6 1.4 1.2 1.0 0.8 4 NT IF 1R 1.4 1.2 1.0 4 NT IF 1L 1.5 1.0 0.5 4 NT IF 2L 1.2 1.0 0.8 0.6 5 UR IF 1L

Gain

1.5 1.0 0.5 5 UR IF 2L 2.5 2.0 1.5 1.0 6 ON IF 1R 0.3 0.2 0.1 6 ON IF 1L 0.5 0.4 0.3 0.2 0.1 6 ON IF 2R

TIME (HOURS)

19 20 21 22 23

0.38 0.36 0.34 0.32 0.30

Gain amp vs UTC time for 3C345.MULTI.1 SN 2 Rpol & Lpol IF 1 - 2

Plot file version 3 created 19-OCT-2004 16:37:19

6 ON IF 2L

Gain

TIME (HOURS)

19 20 21 22 23

0.6 0.4 0.2