Center at RA 13 39 23.78306 DEC 63 28 58.4252

CONT: J1339+63 IPOL 994.148 MHZ J1339+6328.ICL001.5

PLot file version 1 created 19-OCT-2004 16:37:46

Cont peak flux = 2.8921E+00 JY/BEAM Levs = 2.892E+00 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250