Tsys vs UTC time for ep046c.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 1 created 19-OCT-2004 15:47:49

1 TR IF 1R

0.06 0.04 0.02 0.00 1 TR IF 1L

0.015 0.010 0.005 0.000 1 TR IF 2R

0.06 0.04 0.02 0.00 1 TR IF 2L

0.008 0.006 0.004 0.002

2 EF IF 1R 2 1 0 2 EF IF 1L

Kilo Kelvin

2 1 0 2 EF IF 2R 1.0 0.5 0.0 2 EF IF 2L 1.0 0.5 0.0 3 WB IF 1R

0.14 0.12 0.10

3 WB IF 1L

TIME (HOURS)

14 16 18 20 22 1/00 1/02 1/04

0.14 0.12 0.10

Tsys vs UTC time for ep046c.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 2 created 19-OCT-2004 15:47:49

3 WB IF 2R

0.14

0.12

0.10

3 WB IF 2L

0.14

0.12

0.10

4 NT IF 1R

0.028 0.026 0.024 0.022

4 NT IF 1L

0.020

0.015

0.010

4 NT IF 2R

0.035

0.030

0.025

4 NT IF 2L

Kilo Kelvin

0.016

0.014

0.012

5 UR IF 1L

0.35 0.30 0.25 0.20 0.15

5 UR IF 2L

0.35 0.30 0.25 0.20 0.15

6 ON IF 1R

0.095 0.090 0.085 0.080 0.075

6 ON IF 1L

TIME (HOURS)

14 16 18 20 22 1/00 1/02 1/04

0.080 0.075 0.070 0.065

Tsys vs UTC time for ep046c.MSORT.1 TY 1 Rpol & Lpol IF 1 - 2

Plot file version 3 created 19-OCT-2004 15:47:49

6 ON IF 2R

0.095 0.090 0.085 0.080 0.075

6 ON IF 2L

Kilo Kelvin

TIME (HOURS)

14 16 18 20 22 1/00 1/02 1/04

0.085 0.080 0.075 0.070 0.065