Center at RA 16 57 20.70890 DEC 57 05 53.5037

CONT: J1657+57 IPOL 4989.552 MHZ J1657+5705.IIM001.1

PLot file version 1 created 30-NOV-2005 12:06:48

Cont peak flux = 7.0992E-01 JY/BEAM Levs = 7.099E-01 * (-0.200, 0.200, 0.400, 0.800)

MilliARC SEC

MilliARC SEC

100 50 0 -50 -100

100

80

60

40

20

0

-20

-40

-60

-80

-100