Center at RA 09 55 33.17307 DEC 69 03 55.0610

CONT: M81 IPOL 1657.498 MHZ M81.ICL001.5

PLot file version 1 created 15-DEC-2005 18:57:25

Cont peak flux = 1.0361E-01 JY/BEAM Levs = 1.036E-01 * (-0.013, 0.013, 0.026, 0.051, 0.102, 0.204, 0.408, 0.817)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250