Center at RA 05 16 11.42100 DEC -00 08 59.3800

CONT: ARK120 IPOL 4989.302 MHZ ARK120.ICL001.1

PLot file version 1 created 13-FEB-2006 12:53:45

Cont peak flux = -3.6861E-04 JY/BEAM Levs = 3.686E-06 * (-67.8, 67.75)

MilliARC SEC

MilliARC SEC

80 60 40 20 0 -20 -40 -60 -80

80

60

40

20

0

-20

-40

-60

-80