Center at RA 05 13 40.03253 DEC 01 00 21.6542

CONT: J0513+01 IPOL 4989.302 MHZ J0513+0100.ICL001.3

PLot file version 1 created 13-FEB-2006 12:55:42

Cont peak flux = 2.6404E-01 JY/BEAM Levs = 2.640E-03 * (-0.505, 0.505, 1.009, 2.019, 4.038, 8.076, 16.15, 32.30, 64.61)

MilliARC SEC

MilliARC SEC

80 60 40 20 0 -20 -40 -60 -80

80

60

40

20

0

-20

-40

-60

-80