Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 1 created 25-APR-2018 14:23:31

1 EF IF 1R 5.5 5.0 4.5 1 EF IF 1L 5.5 5.0 4.5 1 EF IF 2R 5.5 5.0 4.5 1 EF IF 2L 5.5 5.0 4.5 1 EF IF 3R 6.0 5.5 5.0 4.5 1 EF IF 3L

Gain

6 5 4 1 EF IF 4R 6.0 5.5 5.0 4.5 1 EF IF 4L 6 5 4 1 EF IF 5R 5.5 5.0 4.5 1 EF IF 5L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

5.5 5.0 4.5 4.0 3.5

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 2 created 25-APR-2018 14:23:31

1 EF IF 6R 5.5 5.0 4.5 1 EF IF 6L 5.5 5.0 4.5 4.0 3.5 1 EF IF 7R 5.5 5.0 4.5 1 EF IF 7L 6 5 4 1 EF IF 8R 5.5 5.0 4.5 1 EF IF 8L

Gain

5.5 5.0 4.5 4.0 3.5 2 JB IF 1R

21.9095 21.9090 21.9085 21.9080 2 JB IF 1L

21.9095 21.9090 21.9085 21.9080 2 JB IF 2R

21.9095 21.9090 21.9085 21.9080 2 JB IF 2L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

21.9095 21.9090 21.9085 21.9080

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 3 created 25-APR-2018 14:23:31

2 JB IF 3R

21.9095 21.9090 21.9085 21.9080 2 JB IF 3L

21.9095 21.9090 21.9085 21.9080 2 JB IF 4R

21.9095 21.9090 21.9085 21.9080 2 JB IF 4L

21.9095 21.9090 21.9085 21.9080 2 JB IF 5R

21.9095 21.9090 21.9085 21.9080 2 JB IF 5L

Gain

21.9095 21.9090 21.9085 21.9080 2 JB IF 6R

21.9095 21.9090 21.9085 21.9080 2 JB IF 6L

21.9095 21.9090 21.9085 21.9080 2 JB IF 7R

21.9095 21.9090 21.9085 21.9080 2 JB IF 7L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

21.9095 21.9090 21.9085 21.9080

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 4 created 25-APR-2018 14:23:31

2 JB IF 8R

21.9095 21.9090 21.9085 21.9080

2 JB IF 8L

21.9095 21.9090 21.9085 21.9080

3 MC IF 1R 20 18 16 14 3 MC IF 1L 25 20 15 3 MC IF 2R 18 16 14 3 MC IF 2L 25 20 15 3 MC IF 3R 18 16 14 12 3 MC IF 3L 20 15 3 MC IF 4R 22 20 18 16 14 12 3 MC IF 4L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

25 20 15

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 5 created 25-APR-2018 14:23:31

3 MC IF 5R 18 16 14 12 3 MC IF 5L 20 15 10 5 3 MC IF 6R 18 16 14 12 3 MC IF 6L 20 15 10 5 3 MC IF 7R 20 18 16 14 3 MC IF 7L 22 20 18 16 14 12 3 MC IF 8R 18 16 14 3 MC IF 8L 20 18 16 14 12 4 NT IF 1R 28 26 24 22 20 4 NT IF 1L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

22 20 18 16

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 6 created 25-APR-2018 14:23:31

4 NT IF 2R 26 24 22 20 18 4 NT IF 2L 24 22 20 18 4 NT IF 3R 24 22 20 18 16 4 NT IF 3L 22 20 18 4 NT IF 4R 22 20 18 16 4 NT IF 4L 22 20 18 16 4 NT IF 5R 24 22 20 18 4 NT IF 5L 24 22 20 18 4 NT IF 6R 26 24 22 20 18 4 NT IF 6L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

24 22 20 18

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 7 created 25-APR-2018 14:23:31

4 NT IF 7R 24 22 20 18 4 NT IF 7L 26 24 22 20 4 NT IF 8R 24 22 20 18 16 4 NT IF 8L 28 26 24 22 20 6 TR IF 1R 20 18 16 14 6 TR IF 1L 20 18 16 14 6 TR IF 2R 22 20 18 16 14 6 TR IF 2L 20 18 16 14 6 TR IF 3R 22 20 18 16 14 6 TR IF 3L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

22 20 18 16 14

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 8 created 25-APR-2018 14:23:31

6 TR IF 4R 20 18 16 14 6 TR IF 4L 20 18 16 14 6 TR IF 5R 20 18 16 14 6 TR IF 5L 20 18 16 14 6 TR IF 6R 22 20 18 16 14 6 TR IF 6L 20 18 16 14 6 TR IF 7R 22 20 18 16 14 6 TR IF 7L 22 20 18 16 14 6 TR IF 8R 20 18 16 14 6 TR IF 8L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

20 18 16 14

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 9 created 25-APR-2018 14:23:31

7 WB IF 1R 38 36 34 32 7 WB IF 1L 33 32 31 7 WB IF 2R 30 29 28 27 7 WB IF 2L

26.4 26.2 26.0 25.8

7 WB IF 3R 28 26 24 7 WB IF 3L

26.8 26.6 26.4 26.2

7 WB IF 4R 30 28 26 24 7 WB IF 4L

27.4 27.2 27.0 26.8

7 WB IF 5R 38 36 34 32 7 WB IF 5L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

33 32 31

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 10 created 25-APR-2018 14:23:31

7 WB IF 6R 30 29 28 27 7 WB IF 6L

26.4 26.2 26.0 25.8

7 WB IF 7R 28 26 24 7 WB IF 7L

26.8 26.6 26.4 26.2

7 WB IF 8R 30 28 26 24 7 WB IF 8L

27.4

27.2

27.0

26.8

8 YS IF 1R 20 18 16 14 12 8 YS IF 1L 20 15 10 8 YS IF 2R

12.5 12.0 11.5 11.0 10.5

8 YS IF 2L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

18 16 14 12 10

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 11 created 25-APR-2018 14:23:31

8 YS IF 3R 14 13 12 11 8 YS IF 3L 18 16 14 12 10 8 YS IF 4R 18 16 14 12 8 YS IF 4L 20 15 10 8 YS IF 5R 18 16 14 12 8 YS IF 5L 22 20 18 16 14 8 YS IF 6R 22 20 18 16 14 12 8 YS IF 6L 25 20 15 8 YS IF 7R 16 14 12 8 YS IF 7L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

16 14 12

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 12 created 25-APR-2018 14:23:31

8 YS IF 8R 16 14 12 8 YS IF 8L 18 16 14 9 IR IF 1R

20.7370 20.7365 20.7360 20.7355

9 IR IF 1L

20.7370 20.7365 20.7360 20.7355

9 IR IF 2R

20.7370 20.7365 20.7360 20.7355

9 IR IF 2L

20.7370 20.7365 20.7360 20.7355

9 IR IF 3R

20.7370 20.7365 20.7360 20.7355

9 IR IF 3L

20.7370 20.7365 20.7360 20.7355

9 IR IF 4R

20.7370 20.7365 20.7360 20.7355

9 IR IF 4L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

20.7370 20.7365 20.7360 20.7355

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 15 created 25-APR-2018 14:23:31

10 SV IF 7R 16 14 12 10 SV IF 7L 18 16 14 10 SV IF 8R 16 14 12 10 SV IF 8L 18 16 14 11 ZC IF 1R 16 14 12 11 ZC IF 1L

Gain

14 13 12 11 11 ZC IF 2R 16 14 12 11 ZC IF 2L 13 12 11 11 ZC IF 3R 15 14 13 12 11 ZC IF 3L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

13 12 11

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 16 created 25-APR-2018 14:23:31

11 ZC IF 4R 15 14 13 12 11 ZC IF 4L 13 12 11 10 11 ZC IF 5R 15 14 13 12 11 ZC IF 5L 13 12 11 10 11 ZC IF 6R 15 14 13 12 11 ZC IF 6L

Gain

13 12 11 10 11 ZC IF 7R 15 14 13 12 11 ZC IF 7L 13 12 11 10 11 ZC IF 8R 15 14 13 12 11 ZC IF 8L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

12 11 10

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 17 created 25-APR-2018 14:23:31

12 HH IF 1R 34 32 30 12 HH IF 1L 32 30 28 26 12 HH IF 2R 34 32 30 28 12 HH IF 2L 32 30 28 26 12 HH IF 3R 34 32 30 28 12 HH IF 3L

Gain

32 30 28 12 HH IF 4R 32 30 28 12 HH IF 4L 32 30 28 26 12 HH IF 5R 34 32 30 28 12 HH IF 5L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

32 30 28 26

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 18 created 25-APR-2018 14:23:31

12 HH IF 6R 34 32 30 28 12 HH IF 6L 32 30 28 12 HH IF 7R 32 30 28 12 HH IF 7L 32 30 28 26 12 HH IF 8R 32 30 28 12 HH IF 8L

Gain

32 30 28 26 13 UR IF 1R

15.8120 15.8115 15.8110 15.8105 13 UR IF 1L

15.8120 15.8115 15.8110 15.8105 13 UR IF 2R

15.8120 15.8115 15.8110 15.8105 13 UR IF 2L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

15.8120 15.8115 15.8110 15.8105

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 19 created 25-APR-2018 14:23:31

13 UR IF 3R

15.8120 15.8115 15.8110 15.8105

13 UR IF 3L

15.8120 15.8115 15.8110 15.8105

13 UR IF 4R

15.8120 15.8115 15.8110 15.8105

13 UR IF 4L

15.8120 15.8115 15.8110 15.8105

13 UR IF 5R

15.8120 15.8115 15.8110 15.8105

13 UR IF 5L

Gain

15.8120 15.8115 15.8110 15.8105

13 UR IF 6R

15.8120 15.8115 15.8110 15.8105

13 UR IF 6L

15.8120 15.8115 15.8110 15.8105

13 UR IF 7R

15.8120 15.8115 15.8110 15.8105

13 UR IF 7L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

15.8120 15.8115 15.8110 15.8105

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 20 created 25-APR-2018 14:23:31

13 UR IF 8R

15.8120 15.8115 15.8110 15.8105

13 UR IF 8L

15.8120 15.8115 15.8110 15.8105

14 BD IF 1R 22 20 18 16 14 14 BD IF 1L 22 20 18 16 14 12 14 BD IF 2R 22 20 18 16 14 12 14 BD IF 2L 22 20 18 16 14 12 14 BD IF 3R 22 20 18 16 14 12 14 BD IF 3L 20 18 16 14 12 14 BD IF 4R 22 20 18 16 14 12 14 BD IF 4L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

20 18 16 14 12

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 21 created 25-APR-2018 14:23:31

14 BD IF 5R 22 20 18 16 14 12 14 BD IF 5L 20 18 16 14 12 14 BD IF 6R 22 20 18 16 14 12 14 BD IF 6L 20 18 16 14 12 14 BD IF 7R 22 20 18 16 14 14 BD IF 7L 18 16 14 12 14 BD IF 8R 20 18 16 14 12 14 BD IF 8L 18 16 14 12 15 T6 IF 1R 8 6 4 15 T6 IF 1L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

14 12 10 8 6 4

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 22 created 25-APR-2018 14:23:31

15 T6 IF 2R 9 8 7 6 5 15 T6 IF 2L 15 10 5 15 T6 IF 3R 9 8 7 6 5 15 T6 IF 3L 12 10 8 6 4 15 T6 IF 4R 9 8 7 6 5 15 T6 IF 4L 14 12 10 8 6 4 15 T6 IF 5R 8 6 4 15 T6 IF 5L 10 8 6 4 15 T6 IF 6R 8 6 4 15 T6 IF 6L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

10 8 6 4

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 23 created 25-APR-2018 14:23:31

15 T6 IF 7R 8 6 4 15 T6 IF 7L 30 20 10 15 T6 IF 8R 8 6 4 15 T6 IF 8L 15 10 5 16 GB IF 1R 4.0 3.8 3.6 3.4 3.2 16 GB IF 1L 20 15 10 5 16 GB IF 2R 4.0 3.8 3.6 3.4 3.2 16 GB IF 2L 20 15 10 5 16 GB IF 3R 4.0 3.8 3.6 3.4 3.2 16 GB IF 3L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

20 15 10 5

Gain amp vs UTC time for EP103E.UVDATA.1 CL 2 Rpol & Lpol IF 1 - 8

Plot file version 24 created 25-APR-2018 14:23:31

16 GB IF 4R 4.0 3.8 3.6 3.4 3.2 16 GB IF 4L 20 15 10 5 16 GB IF 5R 4.0 3.8 3.6 3.4 16 GB IF 5L 20 15 10 5 16 GB IF 6R 4.0 3.8 3.6 3.4 16 GB IF 6L 20 15 10 5 16 GB IF 7R 4.2 4.0 3.8 3.6 3.4 16 GB IF 7L 20 15 10 5 16 GB IF 8R 4.2 4.0 3.8 3.6 3.4 16 GB IF 8L

Time (hours)

20 22 1/00 1/02 1/04 1/06 1/08 1/10

20 15 10 5