Center at RA 08 23 41.13199 DEC 29 28 28.1990

CONT: J0823+29 IPOL 1421.472 MHZ J0823+2928.ICL001.3

PLot file version 1 created 04-JUN-2002 15:10:39

Cont peak flux = 5.8412E-01 JY/BEAM Levs = 5.841E-01 * (-0.019, 0.019, 0.037, 0.074, 0.148, 0.297, 0.594)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250