IF 1- 1 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 1613+341.UVSUB.1

PLot file version 1 created 28-MAY-2002 15:19:24

200 100 0 -100

EF-WB-ON

200 100 0 -100

EF-WB-MC

Degrees

100 0 -100

WB-ON-MC

200 100 0 -100

EF-WB-JB

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

200 100 0 -100

WB-ON-JB

IF 1- 1 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 1613+341.UVSUB.1

PLot file version 2 created 28-MAY-2002 15:19:25

100 0 -100

ON-MC-JB

200 100 0 -100

EF-WB-TR

Degrees

200 100 0 -100

WB-ON-TR

200 100 0 -100

ON-MC-TR

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

200 100 0 -100

MC-JB-TR

IF 2- 2 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 1613+341.UVSUB.1

PLot file version 3 created 28-MAY-2002 15:19:28

200 100 0 -100

EF-WB-ON

200 100 0 -100

EF-WB-MC

Degrees

100 0 -100

WB-ON-MC

200 100 0 -100

EF-WB-JB

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

200 100 0 -100

WB-ON-JB

IF 2- 2 CH 1- 1 STK LL CC ver 0

Closure Phase vs Time for 1613+341.UVSUB.1

PLot file version 4 created 28-MAY-2002 15:19:29

150 100 50 0 -50 -100

ON-MC-JB

200 100 0 -100

EF-WB-TR

Degrees

-155 -160 -165 -170 -175 -180

WB-ON-TR

100 0 -100

ON-MC-TR

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

200 100 0 -100

MC-JB-TR

IF 1- 1 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for 1613+341.UVSUB.1

PLot file version 5 created 28-MAY-2002 15:19:32

200 100 0 -100

EF-WB-ON

200 100 0 -100

EF-WB-MC

Degrees

100 0 -100

WB-ON-MC

200 100 0 -100

EF-WB-JB

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

200 100 0 -100

WB-ON-JB

IF 1- 1 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for 1613+341.UVSUB.1

PLot file version 6 created 28-MAY-2002 15:19:33

150 100 50 0 -50 -100

ON-MC-JB

200 100 0 -100

EF-WB-TR

Degrees

200 100 0 -100

WB-ON-TR

100 0 -100

ON-MC-TR

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

200 100 0 -100

MC-JB-TR

IF 2- 2 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for 1613+341.UVSUB.1

PLot file version 7 created 28-MAY-2002 15:19:37

200 100 0 -100

EF-WB-ON

200 100 0 -100

EF-WB-MC

Degrees

200 100 0 -100

WB-ON-MC

200 100 0 -100

EF-WB-JB

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

200 100 0 -100

WB-ON-JB

IF 2- 2 CH 1- 1 STK RR CC ver 0

Closure Phase vs Time for 1613+341.UVSUB.1

PLot file version 8 created 28-MAY-2002 15:19:37

100 0 -100

ON-MC-JB

200 100 0 -100

EF-WB-TR

Degrees

200 100 0 -100

WB-ON-TR

200 100 0 -100

ON-MC-TR

TIME (HOURS)

1/02 1/03 1/04 1/05 1/06 1/07 1/08

200 100 0 -100

MC-JB-TR