Center at RA 16 13 41.06450 DEC 34 12 47.9100

CONT: 1613+341 IPOL 1372.602 MHZ 1613+341.ICL001.4

PLot file version 1 created 29-MAY-2002 09:53:06

Cont peak flux = 4.3519E+00 JY/BEAM Levs = 4.352E+00 * (-0.018, 0.018, 0.037, 0.073, 0.147, 0.294, 0.588)

MilliARC SEC

MilliARC SEC

200 100 0 -100 -200

250

200

150

100

50

0

-50

-100

-150

-200

-250